-20000

-10000 0 10000

20000

30000

40000

50000

1400 1600 1800 2000 2200 2400

Optical Signal

IceCube HoleΦ(year) 50 66 21 86 52 10 2 14

(04-05) (09-10)

(05-06)

(06-07)

(07-08) (08-09) (08-09) (10-11) LGM DepthΜmetersΝ